5 10 15 20 0

0.2

0.4

0.6

0.8

time {seconds}

Magnetic Moment {Mz}

0 0.2 0.4 0.6 0.8 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

signal for scan i signal for scan i + 1