50 100 150 200 250 300 350 0 0.5 1

time {seconds}

Magnetic Moment {Mz}

20 40 60 80 100 120 0 0.5 1

time {scan} proportion of spins excited

0 5 10 0

0.2

0.4

time {scan} coefficients c1,c2.....

20 40 60 80 100 120 0 0.2 0.4 0.6 0.8 1

time {scan} predicted (....) and actual (_____) signal