SPM{Z}

Design Matrix 1 2

2 4 6 8 10 12 contrast

region {x,y,x mm} size {n} Zmax P(n > n) P(Z > Z)

max max

-36 -80 -4 722 5.54 0.000 0.000 -46 16 0 245 5.42 0.001 0.000 -2 16 56 668 5.20 0.000 0.001 38 -70 -28 124 5.13 0.012 0.001 22 64 8 82 4.91 0.030 0.004 -30 50 28 136 4.63 0.009 0.014 -22 64 0 16 4.58 0.192 0.016 2 -86 36 63 4.48 0.048 0.025

Threshold = 3.60 Volume = 78217 and smoothness = [3.05 3.71 2.16] voxels and df = 10

Figure 1

Single subject analysis