SPM{Z}

Design Matrix

5 10 15

10 20 30 40 50 60 contrast

region {x,y,x mm} size {n} Zmax P(n > n) P(Z > Z)

max max

-2 20 40 938 6.78 0.000 0.000 -48 20 4 2697 6.23 0.000 0.000 -12 -14 8 2211 5.68 0.000 0.000 -50 -66 -8 646 5.59 0.000 0.000 54 22 0 58 4.68 0.222 0.008 24 42 32 104 4.39 0.110 0.027 -34 -82 24 76 4.14 0.167 0.067

Threshold = 3.20 Volume = 69142 and smoothness = [3.33 4.01 2.23] voxels and df = 43

A subtraction

Figure 3