SPM{Z}

Design Matrix

5 10 15

10 20 30 40 50 60 contrast

region {x,y,x mm} size {n} Zmax P(n > n) P(Z > Z)

max max

-54 -50 8 570 4.59 0.076 0.012 54 -48 4 697 4.42 0.041 0.024 0 -82 40 385 4.10 0.200 0.084 -44 46 -4 540 3.67 0.089 0.350

Threshold = 2.40 Volume = 69142 and FWHM = [15.97 18.97 19.33] mm and df = 43

A parametric analysis

Figure 6