SPM{Z}

Design Matrix

5 10 15 20 25

10 20 30 40 50 60 contrast

region {x,y,x mm} size {n} Zmax P(n > n) P(Z > Z)

max max

44 -18 12 1829 5.87 0.000 0.000

-42 -24 16 478 4.69 0.018 0.008

-2 -24 36 393 4.51 0.033 0.017

Threshold = 2.80 Volume = 69142 and smoothness = [3.59 4.09 1.98] voxels and df = 32

Interaction analysis

Figure 9