-4 -2 0 2 4

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3

translation {mm} change in signal

-0.1 -0.05 0 0.05 0.1

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

rotation {degrees}

signal dependency on position